

To run CALNICA type "@docalnica".  CALNICA will ask for a list of files
to be calibrated and the user types the name of the list.  The files
will be calibrated in batch mode.

Note that if the first line of the list is 

 noima

then the _ima files will not be produced on disk.

For details of the calibration process see the paper:

In the Space Telescope Science Institute's "Instrument Science Report"
number NICMOS-97-009, see the paper "STScI NICMOS Pipeline: CALNICA
Single Image Reduction"

